pager.<cmd>::
	If the value is boolean, turns on or off pagination of the
	output of a particular Git subcommand when writing to a tty.
	Otherwise, turns on pagination for the subcommand using the
	pager specified by the value of `pager.<cmd>`.  If `--paginate`
	or `--no-pager` is specified on the command line, it takes
	precedence over this option.  To disable pagination for all
	commands, set `core.pager` or `GIT_PAGER` to `cat`.
